10^2 10^3 10^4 10^5 0.2

0.3

0.4

0.5

0.6

0.7

0.8

Number of features

Precision at top 1

MFCC Baseline Matching Pursuit Box Sizes (down) Box Sizes (up) AIM-SAI Codebook Sizes

1 box, 32x64 (up)

1 box, 32x64 (down) 1 box 8x16 (down)

5 boxes, 16x32 (up)

66 boxes, 8x16 (down)

4 means

4 means (MP)

16 means

3000 means (MP)

13 MFCCs, 15ms frames

16 means (MP)

40 MFCCs, 40ms frames baseline

6000 means

4000 means